\section{monitor Namespace Reference}
\label{namespacemonitor}\index{monitor@{monitor}}
\subsection*{Classes}
\begin{DoxyCompactItemize}
\item 
class \textbf{ Client}
\begin{DoxyCompactList}\small\item\em Static class for T\+CP client \end{DoxyCompactList}\item 
class \textbf{ Command\+Manager}
\begin{DoxyCompactList}\small\item\em Command Manager. Use for timeout managment during reception of data Used as intermediate layer between T\+CP client class (\doxyref{Client}{p.}{classmonitor_1_1_client}) and application level managment of command and answers \end{DoxyCompactList}\item 
class \textbf{ Destijl\+Command\+List}
\begin{DoxyCompactList}\small\item\em Commands and options parameters used in Destijl project when communicating with server \end{DoxyCompactList}\item 
class \textbf{ Destijl\+Command\+Manager}
\begin{DoxyCompactList}\small\item\em Specialization class for command manager, which implemnent destijl protocol between monitor and server \end{DoxyCompactList}\item 
class \textbf{ Main\+Class}
\item 
class \textbf{ Robot\+Command\+List}
\begin{DoxyCompactList}\small\item\em Commands used for robot messages \end{DoxyCompactList}\end{DoxyCompactItemize}
